---
title: How to set buffer time
---

You can either set a before event buffer time, an after event buffer time, or both. Here's how to do that:
<Steps>
<Step>
Select your event type where you wish to add the buffer time
</Step>
<Step>
To add a buffer time, click on the Limits tab

[![](https://calcom-inc-0470baa6daee.intercom-attachments-1.com/i/o/1195439258/e54bb9bb9943d0e595412af1/i1600x899-j1Js2xXV665U_gkxhvi.png?expires=1736323200&signature=6a70d0e16718b9186f3e498c390f04420a8c6886c717cf41f54eddb080692f11&req=dSEuE819lINaUfMW1HO4zYWCHcw7kcR3sv4%2FP48yT8sEuvMT%2BWudvYYSHIoO%0ANKRQ%0A)](https://calcom-inc-0470baa6daee.intercom-attachments-1.com/i/o/1195439258/e54bb9bb9943d0e595412af1/i1600x899-j1Js2xXV665U_gkxhvi.png?expires=1736323200&signature=6a70d0e16718b9186f3e498c390f04420a8c6886c717cf41f54eddb080692f11&req=dSEuE819lINaUfMW1HO4zYWCHcw7kcR3sv4%2FP48yT8sEuvMT%2BWudvYYSHIoO%0ANKRQ%0A)
</Step>
<Step>
Then, click on the before event, or after event select box to view the buffer time options in minutes and select the buffer time of your choice

[![](https://calcom-inc-0470baa6daee.intercom-attachments-1.com/i/o/1195439285/5758803d6a12925922fe5db7/i1600x899-yn-lgJSvElO2_hxc61t.png?expires=1736323200&signature=35c70379597750a4de7f9432019f3316d8359ee16dbf58eb4baf49c846578a05&req=dSEuE819lINXXPMW1HO4zfvmVjIthaHibVb9tN3vljD3awd5W4TMrAha45Uu%0A8fNp%0A)](https://calcom-inc-0470baa6daee.intercom-attachments-1.com/i/o/1195439285/5758803d6a12925922fe5db7/i1600x899-yn-lgJSvElO2_hxc61t.png?expires=1736323200&signature=35c70379597750a4de7f9432019f3316d8359ee16dbf58eb4baf49c846578a05&req=dSEuE819lINXXPMW1HO4zfvmVjIthaHibVb9tN3vljD3awd5W4TMrAha45Uu%0A8fNp%0A)
</Step>
<Step>
Click on Update to save your changes. Your event type should now consider the newly added buffer time
</Step>
</Steps>
