---
title: 'Set up your availability'
---

Follow these step-by-step instructions to configure your availability in Cal.com based on your individual preferences:

<Steps>
  <Step title="Access availability settings">
    * Log in to your Cal.com account. 
    * Click Availability in the sidebar. You’ll see your existing availability schedules, such as "Working Hours" or any other you’ve added before.
  </Step>
  <Step title="Create a new availability schedule">
    * Click New in the top-right corner.
* Enter a name for your schedule (e.g., "Test Availability").
* Click Continue to create your schedule.
By default, the schedule is set to 9:00 AM to 5:00 PM.
  </Step>
  <Step title="Customize your availability">
    * Enable/Disable Days:
Toggle days on or off based on when you're available.
For example, you can set availability until 1:00 PM on a Saturday.
* Edit Times for Specific Days:
Click a time box to adjust availability for specific days.
For example, change Monday’s availability to 9:00 AM to 6:00 PM.
* Copy Times to Other Days:
After setting times for one day, click Copy Times To and select other days (e.g., Tuesday–Friday).
* Add Multiple Time Slots:
Add additional time slots to split your availability (e.g., 9:00 AM–11:00 AM and 5:00 PM–7:30 PM).
  </Step>
  <Step title="Add Day overrides">
    Use day overrides for special cases when your availability changes for specific dates.
* Click Add an Override.
Example: Choose a date (e.g., Wednesday) and mark yourself as completely unavailable.
Overrides are automatically archived once the date has passed.
</Step>
  <Step title="Adjust your time zone">
    Set a specific time zone for your availability.
Useful if your availability changes when traveling to another country.
    </Step>
  <Step title="Troubleshoot availability issues">
    If you notice times not showing up as expected, click Launch Troubleshooter.
This tool helps identify issues based on how Cal.com determines your availability.
     </Step>
  </Steps>

